##########################
# YAIM related variables #
##########################

# This a variable to debug your configuration.
# If it is set, functions will print debugging information.
# Values: NONE, ABORT, ERROR, WARNING, INFO, DEBUG
YAIM_LOGGING_LEVEL=INFO

###################################
# General configuration variables #
###################################

MY_DOMAIN=$(hostname -d)
INSTALL_ROOT=/opt

# These variables tell YAIM where to find additional configuration files.
WN_LIST=/opt/glite/yaim/etc/wn-list.conf
USERS_CONF=/opt/glite/yaim/etc/users.conf
GROUPS_CONF=/opt/glite/yaim/etc/groups.conf
FUNCTIONS_DIR=/opt/glite/yaim/functions

OUTPUT_STORAGE=/tmp/jobOutput

# Set this to your prefered and firewall allowed port range
GLOBUS_TCP_PORT_RANGE="20000,25000"

PX_HOST=lcg14.sinp.msu.ru
BDII_HOST=lcg-bdii.cern.ch
MON_HOST=my-mon.cern.ch
REG_HOST=my-reg.cern.ch
VOS="atlas dteam photon"
QUEUES=${VOS}
LB_HOST="my-lb.sinp.msu.ru:9000"

USERS_CONF=$INSTALL_ROOT/glite/yaim/examples/users.conf
SITE_EMAIL=devnull@freesurf.ch
JAVA_LOCATION=/usr/java/jdk1.5.0_14
DUMMY_GROUP_ENABLE="dummy" 
CA_REPOSITORY="rpm http://linuxsoft.cern.ch/ LCG-CAs/current production" 

WMS_HOST=lcg16.sinp.msu.ru
LFC_HOST=lcg04.sinp.msu.ru
RB_HOST=lcg36.sinp.msu.ru

ATLAS_GROUP_ENABLE="atlas"

VO_SW_DIR=/opt/exp_soft

#########
# atlas #  from /opt/glite/yaim/examples/siteinfo/site-info.def
#########

# VO specific settings. For help see: https://lcg-sft.cern.ch/yaimtool/yaimtool.py
VO_ATLAS_SW_DIR=$VO_SW_DIR/atlas
VO_ATLAS_DEFAULT_SE=$CLASSIC_HOST
VO_ATLAS_STORAGE_DIR=$CLASSIC_STORAGE_DIR/atlas
VO_ATLAS_QUEUES="atlas"
VO_ATLAS_VOMS_POOL_PATH="/lcg1"
VO_ATLAS_VOMS_SERVERS='vomss://voms.cern.ch:8443/voms/atlas?/atlas/'
VO_ATLAS_VOMSES="'atlas lcg-voms.cern.ch 15001 /DC=ch/DC=cern/OU=computers/CN=lcg-voms.cern.ch atlas 24' 'atlas voms.cern.ch 15001 /DC=ch/DC=cern/OU=computers/CN=voms.cern.ch atlas 24'"
VO_ATLAS_VOMS_CA_DN="'/DC=ch/DC=cern/CN=CERN Trusted Certification Authority' '/DC=ch/DC=cern/CN=CERN Trusted Certification Authority'"

VO_ATLAS_USERS="ldap://grid-vo.nikhef.nl/ou=lcg1,o=atlas,dc=eu-datagrid,dc=org"
VO_ATLAS_SGM="ldap://grid-vo.nikhef.nl/ou=lcgadmin,o=atlas,dc=eu-datagrid,dc=org"


VO_DTEAM_SW_DIR=$VO_SW_DIR/dteam
VO_DTEAM_DEFAULT_SE=$CLASSIC_HOST
VO_DTEAM_STORAGE_DIR=$CLASSIC_STORAGE_DIR/dteam
VO_DTEAM_QUEUES="dteam"
VO_DTEAM_VOMS_SERVERS='vomss://voms.cern.ch:8443/voms/dteam?/dteam/'
VO_DTEAM_VOMSES="'dteam lcg-voms.cern.ch 15004 /C=CH/O=CERN/OU=GRID/CN=host/lcg-voms.cern.ch dteam' 'dteam voms.cern.ch 15004  /DC=ch/DC=cern/OU=computers/CN=voms.cern.ch dteam'"

PHOTON_GROUP_ENABLE="photon"

# from http://grid.sinp.msu.ru/grid/roc/voconfig_yaim :
# rpm -ivh http://grid.sinp.msu.ru/lcg-vomscerts-rdig-1.0-1.noarch.rpm
# new (26.04.2008) from http://grid.sinp.msu.ru/grid/roc/voconfig_yaim
#  but the same as before (above), but EXTRA! VO_PHOTON_VOMS_CA_DN
VO_PHOTON_USERS="vomss://rdig-registrar.sinp.msu.ru:8443/voms/photon?/photon/"
VO_PHOTON_VOMS_SERVERS="'vomss://rdig-registrar.sinp.msu.ru:8443/voms/photon?/photon/'"
VO_PHOTON_SGM="vomss://rdig-registrar.sinp.msu.ru:8443/voms/photon?/photon/Role=lcgadmin"
VO_PHOTON_QUEUES="photon"
VO_PHOTON_SW_DIR="/shift/lcgfs04/d2/photon_soft"
VO_PHOTON_DEFAULT_SE=$CLASSIC_HOST
VO_PHOTON_STORAGE_DIR=$CLASSIC_STORAGE_DIR/photon
VO_PHOTON_VOMS_EXTRA_MAPS=""
VO_PHOTON_VOMSES="'photon rdig-registrar.sinp.msu.ru 15003 /C=RU/O=RDIG/OU=hosts/OU=sinp.msu.ru/CN=host/rdig-registrar.sinp.msu.ru photon'"
VO_PHOTON_VOMS_POOL_PATH=""
VO_PHOTON_VOMS_CA_DN="'/C=RU/O=RDIG/CN=Russian Data-Intensive Grid CA'"

#  Blank is mandatory
GRIDMAP_AUTH=" " 
